Parser

Table des matières

1 Introduction 1

2 Grammaire théorique 1

3 Grammaire implémentée 1

1 Introduction

2 Grammaire théorique

Il faut ajouter un nouveau shell : fichier /SBig/Server/Bigd/Big/POWERControl.c. Sa grammaire sera du type :

order: POWER command1
    | POWER idAlim command2
    | POWER idSensor command3

idAalim: NE
      | NW
      | SE
      | SW

idSensor: S[1-6]

command1: ON
       | OFF
       | GET STATE
       | GET MAXTEMP

command2: GET SENSE VOLTAGE
       | GET NOMINAL VOLTAGE
       | GET CURRENT

command3: GET TEMP

3 Grammaire implémentée

order: POWER command1

command1: ON
       | OFF