Intégration

Table des matières

1 Introduction 1 2 Bibliothèque snmp 1 3 Utilitaire Wiener 1 4 Analyseur Grammatical 1 5 Test 2

1 Introduction

Cette page décrits les modifications apportées au code source de Big.

2 Bibliothèque snmp

• répertoire /SBig/Server/include/net-snmp • fichier /SBig/misc/libnetsnmp.so note : fichier binaire

3 Utilitaire Wiener

• fichier /SBig/Server/Bigd/include/Wiener.h • fichier /SBig/Server/Bigd/Util/Wiener.c

4 Analyseur Grammatical

• fichier /SBig/Server/Bigd/Big/WIENERControl.c • fichier /SBig/Server/include/Control.h

...
extern int WIENERControl(char *);
...

• fichier /SBig/Server/Bigd/Big/Big.c

...
if (!Look4Key(local_buffer,"WIENER", 6) && !(val = WIENERControl (local_buffer+7))) return(NOERR);
...

• fichier /SBig/Server/Bigd/Makefile

...
LIBS += -L../lib -lm -lpthread -lnetsnmp
...
$(PROGRAM): $(wildcard Object/*.o)
                @echo -ne "Linking \t\033[1;31m$(PROGRAM)\033[0;39m ... \t "
                @[ -f ../lib/libnetsnmp.so ] || ln -s ../../misc/libnetsnmp.so ../lib/.
                ...

• fichier /SBig/Server/Client/WIENER_ON

BEGIN
WIENER ON
ENDMSG

• fichier /SBig/Server/Client/WIENER_OFF

BEGIN
WIENER OFF
ENDMSG

5 Test

• Compilation

$ cd ~/SBig/Server/Bigd
$ make

• Lancement du serveur

$ telnet 192.168.1.162
$ ~roche/SBig/Server/Bigd/big

• Allumer/éteindre l’alim 192.168.1.86

$ snmpwalk -v 2c -c public -On 192.168.1.86 .1.3.6.1.4.1.19947.1.1.1.0
.1.3.6.1.4.1.19947.1.1.1.0 = INTEGER: 0

$ telnet 192.168.1.162 1805
BEGIN POWER ON
ENDMSG

$ snmpwalk -v 2c -c public -On 192.168.1.86 .1.3.6.1.4.1.19947.1.1.1.0
.1.3.6.1.4.1.19947.1.1.1.0 = INTEGER: 1

$ cat WIENER_ON | ~/SBig/Server/Client/client 192.168.1.162 1805

$ snmpwalk -v 2c -c public -On 192.168.1.86 .1.3.6.1.4.1.19947.1.1.1.0
.1.3.6.1.4.1.19947.1.1.1.0 = INTEGER: 0