Implementation

Contents

1 Introduction 1 2 Installing, compiling and testing 1 3 API 1 3.1 Configuration . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 1 4 Syslog 1 4.1 Redirection & modifying severity . . . . . . . . . . . . . . . . . . . . . . . . . . . . 1 4.2 Rotation . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 1

1 Introduction 2 Installing, compiling and testing 3 API

3.1 Configuration

4 Syslog

4.1 Redirection & modifying severity 4.2 Rotation