Documentation

This section provide any other documentations about Harpo’s DAQ. • Asic After Internal User Manual

P. Baron, CEA, DSM, DAPNIA SEDI, september 2006 Ref. EDMS: 008673 • T2K TPC Read-out Electronics Digital Front-End Mezzanine Card Denis Calvet, CEA, DSM/IRFU/SEDI, september 2008.

• T2K TPC Read-out Electronics Notes on System Design, Performance and Use Denis Calvet, CEA, DSM/IRFU/SEDI, december 2009 • Compilation of all the articles of this intranet: pdf ps minips