Connect function

Contents

1 Introduction 1

2 Links configuration 1

3 Non regression test 1

1 Introduction

What: Emplementing the “connect” function and the “ping” utility. Located at:

• libLDA/run/connect.o

• libLDA/run/ping

2 Links configuration

# run/fifo poldhcp54.conf -snf

Ping ( 2): 0% [ 1,5] [ 1,8]

*** Total : miss 0 / 2 Pkts = 0%
 DIF [ 1,5] : 1 received + 0 missing 1 pkts and 0 errors.
 DIF [ 1,8] : 1 received + 0 missing 1 pkts and 0 errors.
 Dropped pkts: 0
 Unexpected pkts: 0

3 Non regression test

# run/fifo poldhcp54.conf -f

lush: [buff] [ 1,5] [ 1,8]
Flush( 3): 0% 0 0
Ping ( 602): 0% [ 1,5] [ 1,8]
Ping ( 602): 0% [ 1,5] [ 1,8]
Ping ( 186): 0% [ 1,5] [ 1,8]

*** Total : miss 0 / 1393 Pkts = 0%
 DIF [ 1,5] : 695 received + 0 missing 695 pkts and 0 errors.
 DIF [ 1,8] : 695 received + 0 missing 695 pkts and 0 errors.
 Dropped pkts: 0
 Unexpected pkts: 0