Project SDHCAL Group CALICE Project responsable Vincent Boudry

Tracks changes

• Milestones DIF firmware upgrade to version 2 working on LDA library working on Non regression tests working on

• Todo list provide to Guillaume Baulieu the Spiroc fields for DB write the Online server specification sending Slow control to ASU (to merge) receiving data on trigger from ASU (to test) check CRC computation/global trigger counter (bypassed) install and test the XDAQ user interface (to document) provide registers to libLDA for assynchronous slow control (v2)

• Done

12-2010 Transition’s documentation 1-2011 Test servers dupplication 2-2011 SLC55 port (no libcap) 3-2011 Use callback with libpcap to bypass packets copy 4-2001 Use threads and share data between them 5-2001 Send configuration and read out data 6-2001 Port library software on ECAL

• Troubles Working on ASUv2 since Lyon in fact use ASUv3

send_FC_DIF_reset doesn’t works on DHCAL
send_FC_DIF_read_debug_fifo doesn’t works on DIFv2

LDA suspected to not propagate all read orders libcap need a kernel patch on SLC55 (must use setuid root)