Documentation

This section provide any other documentations about Calice’s DAQ V2. • For the online documentation, do:

$ export MANPATH=.../libLDA/man
$ man libLDA
or
# cp libLDA/man/man1/pcat.1 /usr/share/man/man1/
# cp libLDA/man/man1/calDump.1 /usr/share/man/man1/
# cp libLDA/man/man3/libLDA.3 /usr/share/man/man3/
# cp libLDA/man/man5/libLDA.5 /usr/share/man/man5/
$ man libLDA

• The ODR user doc • The LDA user doc • Format of the read-out data of the DIF • DIF - Operating Manual

(last version is accessible at desy) • DIF firmware specs v2 • "ROC" chips readout • Database • SVN in2p3 • Forge in2p3

• LCIO

• Compilation of all the articles of this intranet: pdf ps minips