calDump(1)

$ groff -man -Tascii calDump.1 | col -b > manual.txt

calDump(1) calDump Manual calDump(1)

NAME
       calDump - Calice DIF’s output data analyser

SYNOPSIS
       cat data/dif-4-9.txt | src/run/calDump

DESCRIPTION
       calDump is a simple data converter from binary to hexadecimal. Using
       it ensure the output data format is correct as will notify all errors
       it found using syslog.

OPTIONS
       No option for now.

EXEMPLE
       This allow to rebuild the file without re-run calDump: $ tail -fn 0
       data/dif-4-9.txt | src/run/calDump

REPORTING BUGS
       Please send a report to nicolas.roche@llr.in2p3.fr

AUTHORS
       Nicolas Roche, David Decotigny.

LICENCE
       This software is released under the GNU General Public License. Please
       read the COPYING file for more information.

SEE ALSO
       The full documentation for libLDA is maintained as a Latex2Html
       intranet. If a browser is installed at your site, the URL
       <http://polype/~roche/calicei/>should give you access to the complete
       manual.
       libLDA(5), pcat(1)

Version 1.0 August 16, 2011 calDump(1)